;; @file
; VMM Ring 0 DLL - Definition file.

;
; Copyright (C) 2006-2007 Sun Microsystems, Inc.
;
; This file is part of VirtualBox Open Source Edition (OSE), as
; available from http://www.virtualbox.org. This file is free software;
; you can redistribute it and/or modify it under the terms of the GNU
; General Public License (GPL) as published by the Free Software
; Foundation, in version 2 as it comes in the "COPYING" file of the
; VirtualBox OSE distribution. VirtualBox OSE is distributed in the
; hope that it will be useful, but WITHOUT ANY WARRANTY of any kind.
;
; Please contact Sun Microsystems, Inc., 4150 Network Circle, Santa
; Clara, CA 95054 USA or visit http://www.sun.com if you need
; additional information or have any questions.
;

LIBRARY VMMR0.r0
EXPORTS
    ; data

    ; code
    PDMCritSectEnter
    PDMCritSectLeave
    PDMQueueAlloc
    PDMQueueFlush
    PDMQueueInsert
    PGMHandlerPhysicalPageTempOff
    PGMShwModifyPage
    IOMMMIOResetRegion
    IOMMMIOModifyPage
    RTLogDefaultInstance
    RTLogRelDefaultInstance
    RTLogLogger
    RTLogLoggerEx
    RTLogLoggerExV
    RTTimeMilliTS
    TMTimerFromMilli
    TMTimerFromMicro
    TMTimerFromNano
    TMTimerGet
    TMTimerGetFreq
    TMTimerIsActive
    TMTimerSet
    TMTimerSetMillies
    TMTimerSetMicro
    TMTimerSetNano
    TMTimerStop
    VMMGetSvnRev
    vmmR0LoggerFlush
    vmmR0LoggerWrapper
    VMSetError
    VMSetErrorV

    ; runtime
    AssertMsg1
    AssertMsg2
    RTAssertShouldPanic
    RTTimeNanoTSLegacySync
    RTTimeNanoTSLegacyAsync
    RTTimeNanoTSLFenceSync
    RTTimeNanoTSLFenceAsync
    ASMMultU64ByU32DivByU32             ; not-os2
    ASMAtomicXchgU8                     ; not-x86
    nocrt_memchr
    nocrt_memcmp
    nocrt_memcpy
    memcpy=nocrt_memcpy                 ; not-os2
    nocrt_memset
    nocrt_strcpy
    nocrt_strcmp
    nocrt_strchr

