;/** @file
; *
; * VBoxGINA -- Windows Logon DLL for VirtualBox
; *
; * Copyright (C) 2006 InnoTek Systemberatung GmbH
; *
; * This file is part of VirtualBox Open Source Edition (OSE), as
; * available from http://www.virtualbox.org. This file is free software;
; * you can redistribute it and/or modify it under the terms of the GNU
; * General Public License as published by the Free Software Foundation,
; * in version 2 as it comes in the "COPYING" file of the VirtualBox OSE
; * distribution. VirtualBox OSE is distributed in the hope that it will
; * be useful, but WITHOUT ANY WARRANTY of any kind.
; *
; * If you received this file as part of a commercial VirtualBox
; * distribution, then only the terms of your commercial VirtualBox
; * license agreement apply instead of the previous paragraph.
; *
; */

LIBRARY VBoxGINA

EXPORTS
	WlxNegotiate
	WlxInitialize
	WlxDisplaySASNotice
	WlxLoggedOutSAS
	WlxActivateUserShell
	WlxLoggedOnSAS
	WlxDisplayLockedNotice
	WlxWkstaLockedSAS
	WlxIsLockOk
	WlxIsLogoffOk
	WlxLogoff
	WlxShutdown
	; 1.1
	WlxScreenSaverNotify
	WlxStartApplication
	; 1.3
	WlxNetworkProviderLoad
	WlxDisplayStatusMessage
	WlxGetStatusMessage
	WlxRemoveStatusMessage
	; 1.4
	WlxGetConsoleSwitchCredentials
	WlxReconnectNotify
	WlxDisconnectNotify
