;/** @file
; *
; * VBoxDispD3D
; *
; Copyright (C) 2010 Oracle Corporation
;
; This file is part of VirtualBox Open Source Edition (OSE), as
; available from http://www.virtualbox.org. This file is free software;
; you can redistribute it and/or modify it under the terms of the GNU
; General Public License (GPL) as published by the Free Software
; Foundation, in version 2 as it comes in the "COPYING" file of the
; VirtualBox OSE distribution. VirtualBox OSE is distributed in the
; hope that it will be useful, but WITHOUT ANY WARRANTY of any kind.
;
; */

LIBRARY VBoxDispD3D

EXPORTS
	OpenAdapter
	VBoxDispMpGetCallbacks
    VBoxDispCrHgsmiInit
    VBoxDispCrHgsmiTerm
    VBoxDispCrHgsmiQueryClient
