;
; Export definitions
;
; Copyright (C) 2006-2007 Oracle Corporation
;
; This file is part of VirtualBox Open Source Edition (OSE), as
; available from http://www.virtualbox.org. This file is free software;
; you can redistribute it and/or modify it under the terms of the GNU
; General Public License (GPL) as published by the Free Software
; Foundation, in version 2 as it comes in the "COPYING" file of the
; VirtualBox OSE distribution. VirtualBox OSE is distributed in the
; hope that it will be useful, but WITHOUT ANY WARRANTY of any kind.
;

LIBRARY USBD.SYS

EXPORTS
USBD_AllocateDeviceName
USBD_CalculateUsbBandwidth
USBD_CompleteRequest
USBD_CreateConfigurationRequest
USBD_CreateDevice
USBD_Debug_GetHeap
USBD_Debug_LogEntry
USBD_Debug_RetHeap
USBD_Dispatch
USBD_FreeDeviceMutex
USBD_FreeDeviceName
USBD_GetDeviceInformation
USBD_GetInterfaceLength
USBD_GetPdoRegistryParameter
USBD_GetSuspendPowerState
USBD_GetUSBDIVersion
USBD_InitializeDevice
USBD_MakePdoName
USBD_ParseConfigurationDescriptor
USBD_QueryBusTime
USBD_RegisterHcDeviceCapabilities
USBD_RegisterHcFilter
USBD_RegisterHostController
USBD_RemoveDevice
USBD_RestoreDevice
USBD_SetSuspendPowerState
USBD_WaitDeviceMutex
_USBD_CreateConfigurationRequestEx@8
_USBD_ParseDescriptors@16
_USBD_ParseConfigurationDescriptorEx@28

; win64 strips the _stdcall postfix
USBD_CreateConfigurationRequestEx
USBD_ParseConfigurationDescriptorEx
USBD_ParseDescriptors
