;/** @file
; *
; * VBoxGINA -- Windows Logon DLL for VirtualBox
; *
; Copyright (C) 2006-2012 Oracle Corporation
;
; This file is part of VirtualBox Open Source Edition (OSE), as
; available from http://www.virtualbox.org. This file is free software;
; you can redistribute it and/or modify it under the terms of the GNU
; General Public License (GPL) as published by the Free Software
; Foundation, in version 2 as it comes in the "COPYING" file of the
; VirtualBox OSE distribution. VirtualBox OSE is distributed in the
; hope that it will be useful, but WITHOUT ANY WARRANTY of any kind.
;
; */

LIBRARY VBoxGINA

EXPORTS
	WlxNegotiate
	WlxInitialize
	WlxDisplaySASNotice
	WlxLoggedOutSAS
	WlxActivateUserShell
	WlxLoggedOnSAS
	WlxDisplayLockedNotice
	WlxWkstaLockedSAS
	WlxIsLockOk
	WlxIsLogoffOk
	WlxLogoff
	WlxShutdown
	; 1.1
	WlxScreenSaverNotify
	WlxStartApplication
	; 1.3
	WlxNetworkProviderLoad
	WlxDisplayStatusMessage
	WlxGetStatusMessage
	WlxRemoveStatusMessage
	; 1.4
	WlxGetConsoleSwitchCredentials
	WlxReconnectNotify
	WlxDisconnectNotify
    ; Debug
    VBoxGINADebug
    ; Windows Notification Package callbacks
    WnpScreenSaverStop
