;/** @file
; *
; * VBoxGINA -- Windows Logon DLL for VirtualBox
; *
; Copyright (C) 2006-2012 Oracle Corporation
;
; This file is part of VirtualBox Open Source Edition (OSE), as
; available from http://www.virtualbox.org. This file is free software;
; you can redistribute it and/or modify it under the terms of the GNU
; General Public License (GPL) as published by the Free Software
; Foundation, in version 2 as it comes in the "COPYING" file of the
; VirtualBox OSE distribution. VirtualBox OSE is distributed in the
; hope that it will be useful, but WITHOUT ANY WARRANTY of any kind.
;
; */

LIBRARY VBoxGINA

EXPORTS
        WlxNegotiate
        WlxInitialize
        WlxDisplaySASNotice
        WlxLoggedOutSAS
        WlxActivateUserShell
        WlxLoggedOnSAS
        WlxDisplayLockedNotice
        WlxWkstaLockedSAS
        WlxIsLockOk
        WlxIsLogoffOk
        WlxLogoff
        WlxShutdown
        ; 1.1
        WlxScreenSaverNotify
        WlxStartApplication
        ; 1.3
        WlxNetworkProviderLoad
        WlxDisplayStatusMessage
        WlxGetStatusMessage
        WlxRemoveStatusMessage
        ; 1.4
        WlxGetConsoleSwitchCredentials
        WlxReconnectNotify
        WlxDisconnectNotify
    ; Debug
    VBoxGINADebug
    ; Windows Notification Package callbacks
    WnpScreenSaverStop
