; $Id: $
;; @file
; innotek Portable Runtime - Win64 ASM exports.
;

;
; Copyright (C) 2006-2007 Sun Microsystems, Inc.
;
; This file is part of VirtualBox Open Source Edition (OSE), as
; available from http://www.virtualbox.org. This file is free software;
; you can redistribute it and/or modify it under the terms of the GNU
; General Public License (GPL) as published by the Free Software
; Foundation, in version 2 as it comes in the "COPYING" file of the
; VirtualBox OSE distribution. VirtualBox OSE is distributed in the
; hope that it will be useful, but WITHOUT ANY WARRANTY of any kind.
;
; The contents of this file may alternatively be used under the terms
; of the Common Development and Distribution License Version 1.0
; (CDDL) only, as it comes in the "COPYING.CDDL" file of the
; VirtualBox OSE distribution, in which case the provisions of the
; CDDL are applicable instead of those of the GPL.
;
; You may elect to license modified versions of this file under the
; terms and conditions of either the GPL or the CDDL or both.
;
; Please contact Sun Microsystems, Inc., 4150 Network Circle, Santa
; Clara, CA 95054 USA or visit http://www.sun.com if you need
; additional information or have any questions.
;

EXPORTS
    ASMAtomicBitClear
    ASMAtomicBitToggle
    ASMAtomicBitTestAndToggle
    ASMBitFirstClear
    ASMBitFirstSet
    ASMAtomicReadU64
    ASMAtomicXchgU8
    ASMAtomicXchgU16
    ASMGetFlags
    ASMProbeReadByte
    ASMSetFlags
    ASMMultU64ByU32DivByU32

    RTTimeNanoTSLegacySync
    RTTimeNanoTSLegacyAsync
    RTTimeNanoTSLFenceSync
    RTTimeNanoTSLFenceAsync

