; $Id: VBoxGINA.def 98103 2023-01-17 14:15:46Z vboxsync $
;;@file
; VBoxGINA -- Windows Logon DLL for VirtualBox
;

;
; Copyright (C) 2006-2023 Oracle and/or its affiliates.
;
; This file is part of VirtualBox base platform packages, as
; available from https://www.virtualbox.org.
;
; This program is free software; you can redistribute it and/or
; modify it under the terms of the GNU General Public License
; as published by the Free Software Foundation, in version 3 of the
; License.
;
; This program is distributed in the hope that it will be useful, but
; WITHOUT ANY WARRANTY; without even the implied warranty of
; MERCHANTABILITY or FITNESS FOR A PARTICULAR PURPOSE.  See the GNU
; General Public License for more details.
;
; You should have received a copy of the GNU General Public License
; along with this program; if not, see <https://www.gnu.org/licenses>.
;
; SPDX-License-Identifier: GPL-3.0-only
;

LIBRARY VBoxGINA

EXPORTS
        WlxNegotiate
        WlxInitialize
        WlxDisplaySASNotice
        WlxLoggedOutSAS
        WlxActivateUserShell
        WlxLoggedOnSAS
        WlxDisplayLockedNotice
        WlxWkstaLockedSAS
        WlxIsLockOk
        WlxIsLogoffOk
        WlxLogoff
        WlxShutdown
        ; 1.1
        WlxScreenSaverNotify
        WlxStartApplication
        ; 1.3
        WlxNetworkProviderLoad
        WlxDisplayStatusMessage
        WlxGetStatusMessage
        WlxRemoveStatusMessage
        ; 1.4
        WlxGetConsoleSwitchCredentials
        WlxReconnectNotify
        WlxDisconnectNotify
    ; Debug
    VBoxGINADebug
    ; Windows Notification Package callbacks
    WnpScreenSaverStop

